{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"C_FIO","type":"number","width":6,"decimals":0},{"name":"FIO","type":"character","width":23},{"name":"Department","type":"character","width":3},{"name":"Fckat","type":"character","width":2},{"name":"Fcprof","type":"character","width":5},{"name":"Combine","type":"character","width":3},{"name":"Cod","type":"number","width":6,"decimals":2},{"name":"Work_Time","type":"number","width":6,"decimals":2},{"name":"Sum","type":"number","width":12,"decimals":2},{"name":"Cipher","type":"character","width":20},{"name":"DATE_BEG","type":"date","width":8},{"name":"DATE_END","type":"date","width":8}],"n_rows":2,"rows_kept":2,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[664,"\u008fïâã­¨­ \u0091.\u0080.","711","01","02035",null,3.00,164.70,9005.70,"777777777","2018-08-01","2018-08-25"]
[24382,"\u0085¯¨ä ­®¢ \u0080.\u008b.","755","01","02008",null,3.00,142.80,9443.53,"777777777","2018-08-01","2018-08-25"]